font_id
Set the character font to be used in subsequent PGPLOT text rendering.

ARGUMENTS
---------

font_id   -   The type of font to use, specified by one of the
              following integers:

                1 - The default font.
                2 - Roman font
                3 - Italic font
                4 - Script font
