1 Language
                    TEST Language Summary

TEST            : Test current terminal parameters on a target terminal
                  (Very preliminary, DO CONSULT Help TEST)
1 TEST
          [TEST\]TEST

     Very preliminary command to check the validity  of  the  terminal
parameters available in the local table in core memory.

     WARNING -- The terminal selection has a strange behaviour if TEST
is  invoked  before  any  USE  command.   So DO NOT FORGET to select a
Binary Terminal Definition File with the command USE, even if  you  do
not need it, before executing the command TEST.

  Initial prompts :
  -----------------

Terminal ?            Primary name
Mode ?                Secondary name
Output ?              Output device (Default is DEFOUT)
True aspect ratio ?   Answer T or F

  When the cursor appears
  -----------------------

S      To exit

H      To produce a hardcopy with automatic plotter submittal

T      To plot the character string "Abcd1234"
       You are prompted for :
       FONT       1=Hard/Simplex  2=Simplex  3=Duplex
       LETHARD    T/F Enables or disables the hardware generator
       ICOL       Colour [0...15]
       ANGLE      String angle (degrees). Zero only for hard chars.
       IC         Centering [1...9], GreG conventions.

E      Enter A1, A2, B1, B2 to define a zooming window
Other  List the cursor coordinates

  Sorry, this is very crude indeed ! No more HELP is available
within TEST.
