1 Language
                    LRS\ Language Summary
LRS             : Reads an IRAS LRS spectrum into CLASS
1 LRS
          LRS\LRS Alpha Delta Range /LOOK Radius

     Reads an IRAS LRS (Low Resolution Spectrometre) spectrum  into  the
CLASS  buffer.   The  range  can  be either SHORT (8-13 microns) or LONG
(12-22 microns).  The search radius is  specified  in  arc  minutes  and
defaults to 5.

     This command is still experimental, since it uses  a  new  mode  in
CLASS  with an irregularly sampled X axis.  Not all commands will accept
such spectra (but RESAMPLE does).  Please signal any error you may  find
to Thierry Forveille.

     At present, only the LRS atlas is available.  The full database has
been ordered in Groningen and will become available after we receive it.
