CLIC X-Window Interface

	This detached menu controls some of the basic functions
  of the CLIC program, including basic graphic commands and
  a few "general" procedures.

SIC Menu
--------
  This menu controls some SIC commands.

GRAPHIC Menu
------------
  This menu controls basic graphic commands.

CLIC procedure Menu
-------------------
  This menu activates X-Window control panels for high level command
  procedures used for calibration of Plateau de Bure data:

- File
  ----
	Open a data file for input, output or both. Press on FILE to 
	select the   data file in the current directory.
- Raw data file
  -------------
	Open a raw data file (must follow the standard naming convention and
	reside in the sandard directories 
	(IPB_DATA:, IPB_DATA1:,I PB_DATA2:, ... )
- First Look
  ----------
	Perform some basic plots such as Tsys, water vapor content ...
- Standard calibration (2-receiver)
  --------------------
	This procedure calibrates both receivers in parallel; the phase 
	calibration of receiver 1 is used as a starting point for the phase
	calibration of receiver 2 (@pr:x_calib).
  	


