1 Table Line parameter menu

Optional menu for the table creation interface to specify
line parameters. The menu contains:

   Use line parameters ? (Yes or No)
   _________________________________
   Line name
   Rest frequency (in MHz)

These parameters are used only if the TLINENN variable is set to YES.

2 TLINENN
"Use line parameters"
        Select YES if you want to modify the line name and frequency,
        NO otherwise.

2 TNFREQ 
"Line Name"
	New name of the line. The default is the name contained 
	in the header of the data file. 

2 TFFREQ 
"Rest Frequency(MHz)"
	New value for the frequency. The default is rest frequency 
	contained in the header of the data file. 

1 END
