1 Table Resampling Menu

Optional menu for the table creation interface to specify 
resampling parameters. The menu contains:

  Resample spectral data ? (Yes or No)
  ____________________________________ 
  Number of channels
  Reference channel
  Velocity at reference channel (in km/s)
  Velocity resolution (in km/s)

The velocity scale corresponds to the rest frequency present in the
header or modified by `` Line Frequency ''. These parameters
are used only if the TRESAMP variable is set to YES.

2 TRESAMP
" Resampling spectral data ?"
        Select YES if you want to resample the spectra, NO if not.

2 TCHANNELS 
" New Number of channels " 
	Number of channels after resampling. 

2 TREF
"New reference channel "
	Reference channel (at the reference velocity)

2 TVAL
"Velocity at the reference channel "   
	New velocity at the reference channel. Velocity is
	referred to the rest frequency specified for the table.

2 TRESA 
"New Resolution "   
	Spectral resolution in km/s.

1 END



