1 Description
-------------------------------------------------------------------------------
Display package for 2-receiver data                 S. Guilloteau 30-Apr-1997 
-------------------------------------------------------------------------------
This is an X-window interface for command procedure to display
a visual summary of basic information (Tsys, Water, scan lists, etc...)
for dual-frequency observations.

The procedure works also for 1 receiver only.
 

Active Buttons:
---------------
GO	Perform all steps in sequence.

LIST    Select and list observations; Must be done after FILE is changed.

TOTAL   Plot total power output of receivers

TSYS	Plot system temperature of receivers
	 
WATER   Plot derived water vapor content of the atmosphere

PRINT   Prepare report: show-file_name.ps, a Postscript file including 
        plots. 

Inputs:
-------
2 DO_TEX
"Produce TeX report ?" 
	Produce an illustrated Postscript log file (file_name.ps) of the 
	calibration process. The ascii summary file (file_name.sum) is 
	produced in all cases.

2 IREC
"Receiver numbers ?" 
	e.g. "1 2" for both, "1 0" for 1 only, "2 0" for rec. 2 only; 
	if both, use rec. 1 phase for rec. 2

2 FILE_NAME
"File name ?"   
	Press FILE for browser.

2 SCAN_RANGE
"Scan range ?"
	First and Last scan to be used. Set FIRST = 0 and LAST = 10000 
	for all scans (the default).
	
2 MIN_QUAL
"Minimum quality ?"
	Minimum data quality required for data selection. 

1 END
