1 GILDAS Image Header Editor

	Use this panel to view and change the values stored in a GILDAS
	Image or Table. The Header is divided in sections, each of them 
	are accessed through a SubPanel.
	The Go Button will Update the header and remove the Panel.

	Use the Browser (push the "FILE" button) to select the image's filename
	at start.

2 HDS%GENE 
	is an Integer describing the Length of general section
2 HDS%NDIM 
	is an Integer describing the Number of dimensions(Rea DOnly)
2 HDS%DIM 
	is an Integer[4] describing the Dimensions(Rea DOnly)
2 HDS%CONVERT 
	is a Double[3,4] describing the 
	Conversion formulae for the 4 axis:
	on each axis: Reference pixel, Value at reference pixel, Increment
2 HDS%BLAN  
	is an Integer describing the Length of blanking section
2 HDS%BLAN 
	K is a Real[2] describing the Blanking and tolerance
2 HDS%EXTREMA 
	is an Integer describing the Length of extrema section
2 HDS%MAX 
	is a Real describing the Maximum
2 HDS%MIN 
	is a Real describing the Minimum
2 HDS%WHERE 
	is an Integer[4,2] describing the Position of max and min
2 HDS%DESC 
	is an Integer describing the Length of units 
	and coordinate system section
2 HDS%UNIT 
	is a Char*12 describing the Image unit
2 HDS%UNIT1 
	is a Char*12 describing the First axis type
2 HDS%UNIT2 
	is a Char*12 describing the Second axis type
2 HDS%UNIT3 
	is a Char*12 describing the Third axist ype
2 HDS%UNIT4 
	is a Char*12 describing the Fourth axis type
2 HDS%SYSTEM 
	is a Char*12 describing the Coordinate system
2 HDS%POSI 
	is an Integer describing the Length of position section
2 HDS%SOURCE 
	is a Char*12 describing the Source name
2 HDS%RA 
	is a Double describing the RightAscension
2 HDS%DEC 
	is a Double describing the Declination
2 HDS%LII 
	is a Double describing the Galactic longitude
2 HDS%BII 
	is a Double describing the Galactic latitude
2 HDS%EPOCH 
	is a Real describing the Epoch of coordinates
2 HDS%PROJ 
	is an Integer describing the Length of projection section
2 HDS%PTYPE 
	is an Integer describing the Projection type
2 HDS%A0 
	is a Double describing the first coordinate of projection center
2 HDS%D0 
	is a Double describing the second coordinate of projection center
2 HDS%AN 
	GLE is a Double describing the position angle of projection
2 HDS%X_
	AXIS is an Integer describing the First projected axis
2 HDS%Y_
	AXIS is an Integer describing the Second projected axis
2 HDS%SPEC 
	is an Integer describing the Length of spectroscopy section
2 HDS%LINE 
	is a Char*12 describing the Line name
2 HDS%FREQRES 
	is a Double describing the Frequency resolution
2 HDS%FREQOFF 
	is a Double describing the Frequency offset
2 HDS%RESTFRE 
	is a Double describing the Rest Frequency
2 HDS%VELRES 
	is a Real describing the Velocity resolution
2 HDS%VELOFF 
	is a Real describing the Velocity offset
2 HDS%F_
	AXIS is an Integer describing the Frequency/Velocity axis
2 HDS%BEAM 
	is an Integer describing the Length of beam section
2 HDS%MAJOR 
	is a Real describing the Major axis of beam
2 HDS%MINOR 
	is a Real describing the Minor axis of beam
2 HDS%PA 
	is a Real describing the Position angle of beam
