1 QUICKDISPLAY

	This panel controls the quick display of a Gildas Image.  Commands
	IMAGE and PLOT are used to display the image.  Only 2-d images, not
	cubes, can be displayed (if the file is a data cube, only the first
	plane is displayed).

	Parameters:

2 QCKIMG$USEOPT
	(logical)

	Controls whether the next parameters are validated, or the 
	default parameters are used.

2 QCKIMG$NAME
	(character)

	Name of the image file. Press on FILE to browse the current 
	directory.

2 QCKIMG$SCAL
	(character)
	Defines the type of transfer function to be used. Type can be
	LIN(EAR), LOG(ARITHMIC) of EQU(ALIZATION), and the Low_cut and
	High_cut are the lowest and highest represented image values,
	respectively.



2 QCKIMG$MIN
	(real)
	Lowest image value used to define the color scale.

2 QCKIMG$MAX
	(real)
	Highest image value used to define the color scale.

