This panel controls the essential tools to make and display
maps from interferometer data.  3 sub-panels are available:

	UV_MAP		Mapping from UV data
	CLEAN		Cleaning parameters
	DISPLAY		Plotting parameters

Several additional commands can be used from the panel:

	BREAK		Terminates the X-Window mode.

	HARDCOPY	Make a hardcopy of the graphic screen

	PAUSE		Suspend the X-Window mode and return to	
			command mode. X-Window mode can be re-activated
			by command CONTINUE.

	
	
