                          New Imaging Concept

As the result of a collaborative effort, we acknowledge here the 
participation of:

	J.Braine, D.Broguiere, R.Moreno /IRAM,
        R.Neri, A.Perrigouard, A.Sievers / IRAM,
	T.Snijders, J.Wink / IRAM, P.Andre / CEA de Saclay,
	R.Lemke / ESO, C.G.T.Haslam / MPIfR, R.Zylka / MPIfR,
	and F.Motte / Observatoire de Grenoble


    List of available commands: 

    BASELINE        : Baseline removal 
    CHECK           : Data consistency check
    DESPIKE         : Spike removal
    FIELD           : Plot field exploitation 
    FILE            : Define input file
    FIND            : Find a selected range of scans
    FIT             : Fit an arbitrary function (only Gaussian currently)
    FLAG            : Flag a list of channels
    GET             : Load scan 
    HEADER          : Brief scan information 
    LIST            : List scan or subscan related information
    SET             : Enter a value for a parameter 
    SHOW            : Display main observational parameter
    SIMULATE        : Provide simulated NMB data 
    SOLVE           : Solve for focus, pointing and skydip 
    SUPPORT         : Define supports
    VARIABLES       : Enable/disable NIC variables

We refer to the HELP command for more details on the commands.
