1 GILDAS_FITS
        GILDAS_FITS

    Converts a GILDAS image in a disk FITS image.  A disk FITS image  is  an
    2880   bytes   per   block   file  conforming  to  FITS standard for the
    information written in  the  blocks.   Such  disk  FITS  images  can  be
    produced  by  other  packages (e.g.  AIPS).  This task is intended for a
    single image.  For many  images,  or  tape  FITS,  use  the  interactive
    program GFITS.
2 IN$
        TASK\FILE "Input Gildas File" IN$

    The input GILDAS image name
2 FITS$
        TASK\FILE "Output FITS file" FITS$

    The output FITS file name
2 NBIT$
        TASK\INTEGER "Number of bits" NBIT$

    The number of bits in the FITS file. Use 16, 32, -32 (IEEE reals) or -64
    (IEEE double-precision).
2 STYLE$
        TASK\CHARACTER "Style of FITS file (STANDARD or UVFITS)" STYLE$

    Type of output FITS file. Use UVFITS for UV tables, STANDARD for images.
1 END







































