1 UV_MERGE
        UV_MERGE

    This task merges together two tables of UV  data,  to  form   a   single
    output  table.   The  two  input  tables  must  have  the  same spectral
    characteristics (not checked).

    Multiplicative factors may be applied  to  both   the   amplitudes   and
    weights of both tables.
2 TABLE1_IN$
        TASK\CHARACTER "First input UV Table" TABLE1_IN$

    This the name of the first input table (.UVT extension by default)
2 TABLE2_IN$
        TASK\CHARACTER "Second input UV Table (reference)" TABLE2_IN$

    This the name of the second input table (.UVT extension by default)
2 TABLE_OUT$
        TASK\CHARACTER "Output merged UV Table" TABLEOUT$

    This the name of the output table (.UVT extension by default)

2 WEIGHT$
        TASK\REAL "Weight multiplicative factors" WEIGHT$[2]

    These two real numbers are the multiplicative correction factors  to  be
    applied to all the weights of the two tables
2 FACTOR$
        TASK\REAL "Data multiplicative factors" FACTOR$[2]

    These two real numbers are the multiplicative correction factors  to  be
    applied to all the amplitudes of the two tables

1 END
































