1 UV_MODEL
        UV_MODEL

    Compute a UV table from an input image (3-D data cube are allowed) and a
    reference UV table used to specify the UV sampling.

    Related task UV_TABLE will do the same for  a  regular  output  UV  grid
    rather than on the sampling of a template table.

2 UVSAMPLE$
        TASK\FILE "Input UV Sample Table" UVSAMPLE$

    UV table used to define  the  UV  plane  sampling.  U,  V,  date,  time,
    antennas  and  weights are copied from this table to the model one. This
    table could be produced using the ASTRO\UV command.

2 IMAGE$
        TASK\FILE "Input .VLM Cube" IMAGE$

    Image from which the model UV table must be computed. It  should  be  in
    the order Velocity, RA, Dec.

2 UVMODEL$
        TASK\FILE "Output UV Model Table" UVMODEL$

    Output UV table, i.e. the Fourier transform of the IMAGE$ sampled on the
    coordinates specified in the sample UV table UVSAMPLE$ .

1 END





































