1 UV_TABLE
        UV_TABLE

    Compute a UV table from an input image (3-D data cube are allowed).   It
    differs  from  UV_MODEL  in  producing  UV  data on a critically sampled
    rectangular  grid  rather  than  along  user  specified  tracks.  It  is
    typically used to analyse image plane observational data with UV tools.


2 IMAGE$
        TASK\FILE "Input .VLM Cube" IMAGE$

    Image from which the model UV table must be computed. It  should  be  in
    the order Velocity, RA, Dec.

2 UVMODEL$
        TASK\FILE "Output UV Model Table" UVMODEL$

    Output UV table, i.e. the Fourier transform of the IMAGE$ sampled on the
    coordinates specified in the sample UV table UVSAMPLE$ .

1 END












































